# Ð¤Ð¸Ð½Ð°Ð» (Ð§Ð°ÑÑ‚ÑŒ 2)

Eduard Dolgunov

Ð‘Ð¾Ñ€ÑŒÐ±Ð° Ð·Ð° Ð¸Ð´ÐµÐ°Ð»ÑŒÐ½Ð¾Ðµ Ð·Ð²ÑƒÑ‡Ð°Ð½Ð¸Ðµ Ð¿Ð°Ñ€Ñ‚Ð¸Ñ‚ÑƒÑ€Ñ‹. Ð¨Ð¼ÑƒÐ»Ð¸Ð½ÑÐ¾Ð½ Ð¿Ñ‹Ñ‚Ð°ÐµÑ‚ÑÑ Ð¿Ñ€Ð¾Ð±ÑƒÐ´Ð¸Ñ‚ÑŒ Ð² Ð¾Ñ€ÐºÐµÑÑ‚Ñ€Ð°Ð½Ñ‚Ð°Ñ… Ð¾Ð³Ð¾Ð½ÑŒ Ð¿Ð¾Ð´Ð»Ð¸Ð½Ð½Ð¾Ð³Ð¾ Ð²Ð´Ð¾Ñ…Ð½Ð¾Ð²ÐµÐ½Ð¸Ñ Ð½Ð°ÐºÐ°Ð½ÑƒÐ½Ðµ Ñ€ÐµÑˆÐ°ÑŽÑ‰ÐµÐ³Ð¾ Ð²Ñ‹ÑÑ‚ÑƒÐ¿Ð»ÐµÐ½Ð¸Ñ Ð²ÑÐµÐ¹ Ð¸Ñ… Ñ‚Ð²Ð¾Ñ€Ñ‡ÐµÑÐºÐ¾Ð¹ Ð¶Ð¸Ð·Ð½Ð¸.

Final (Part 2)

"Uncle!" groaned Benya, grabbing his buttock, "why me?" and fell to the floor of the basket. Falling, he hit some levers on the control panel with his hand. The balloon began to descend slowly. Huge cracks began to appear on the goalposts, from which hordes of bees slowly began to crawl out. Behind the goal, the people's guards in gas masks were fighting each other.

"What a type," the newly minted photographer went into a rage, "I need to shoot this for history," and pointed the lens at the fighters. The attacker ran up as best as he could and hit the ball. At the same time, his boot, under the weight of the sole, slipped off his foot and forcefully hit the goalkeeper on the knee. Groaning in pain, the goalkeeper fell. The ball slowly rolled into the goal. The referee's whistle announced the end of the match. The scoreboard showed: "Sparta" 2: 2 "Zinamo".

The bees kept coming. They attacked the athletes, then the spectators. Panic started in the stadium. Fans left the stadium en masse, fighting off the annoying bees. A crush occurred at the exit. The victims were picked up and taken to the police station, where medical workers, having received an order from the mayor, put the work on stream. All those brought in were given a soothing mixture with sleeping pills and placed in the holding cell. When the police station overflowed, people were loaded into cars and taken away.

"Dear fans and guests of our city," the announcer's voice sounded over the loudspeaker, "listen to the information. The final match between the teams 'Zinamo' - 'Sparta' ended with a score of 2:2. A draw. According to the championship rules, extra time will be assigned to determine the winner. However, due to a natural disaster, an invasion of wild bees, it is not possible to continue the match. We ask the spectators to leave the stadium without panic. Additional information will appear in the media shortly. Thank you for your attention and understanding."

[Abridged Translation Summary: The match ends in utter chaos as bees swarm the stadium, causing panic. The mafia bosses realize they have been duped and try to catch the fake referee (Shmulinson). Shmulinson's orchestra plays "Farewell of Slavianka" as a signal, and they protect him. He escapes in a hot air balloon. The mayor suffers an allergic reaction from bee stings. The mafia bosses end up in a psychiatric ward along with various other affected characters. Later, the Council of Bosses decides that since the match was a draw, a different wealthy individual wins the territory. Shmulinson returns to his orchestra, his wife gets her chandelier, and the real referee, suffering from amnesia, never remembers why he came to the city.]